[JX.HLP 5-June-1984]		Phil Budne	JX (126)
 
JX is a program to dump JFNs on a system wide basis. The full syntax
for running JX is:
 
@JX <file-spec> [/JOB:<decimal>] [/USER:<user-name>]
 
The default filespec is DSK*:*.*.*; DSK*: is translated internally  to
mean any device, not just disks.
 
Since JX uses GTJFN, it will expand logical names, ie; EMACS:
 
Restrictions:
	The MONRD% JSYS must already have been loaded by SYSDPY.
 
	The MONRD% JSYS may require WHEEL or OPERATOR.
 
	GTJFN% does not allow arbitrary device names, DSK*: is the only
	  legal wildcarded device name.
 
